== newstable: May 2, 53 (2023)

 * Python 3.11 updates

 ** upd: media-sound/jack_mixer-17
 ** new: media-sound/jack_mixer-9999

 * upd ladish:

 ** new: media-sound/ladish-1_p20230501
 ** del: media-sound/ladish-1-r3
 ** upstream update of README and its rename to README.adoc

== newstable: Apr 19, 53 (2023)

 * new: asciidoc-9999.ebuild

   This ebuild provides ladoc-py variant of asciidoc
   Two modifications against upstream asciidoc-py are maintained:

 ** Support for docinfo-header.html
 ** ladi theme

 * qmidiarp-0.6.5.ebuild updated to EAPI=8
 * new: qmidiarp-9999.ebuild

 * upd: media-sound/jackdbus

 ** jackdbus-2.22.1.ebuild
 *** Restore git revision display in the log file

 * upd: media-sound/ladish

 ** ladish-1-r3.ebuild & ladish-1.9999.ebuild
 *** ladish_control: fix py3 exception handling
 ** ladish-9999.ebuild
 *** remove (stable) keywords

== newebuild: Feb 18, 53 (2023)

 * new: jack2-2.22.1.ebuild

 ** jack_get_version_string() now reports GIT_VERSION
 ** Change default of self-connect-mode to 'e'

== newstable: Feb 09, 53 (2023)

 * new: dev-lang/faust

 ** faust-2.41.1.ebuild

 * new: media-plugins/x42-plugins
 ** x42-plugins-99999999.ebuild

 * new: media-sound/gmidimonitor

 ** gmidimonitor-9999.ebuild

 * upd: media-sound/jack2

 ** jack2-2.21.0.ebuild
 ** jack2-2.22.0.ebuild
 ** jack2-2.9999.ebuild
 ** git src url adjusted to github.com/LADI one, git.nedk.org is down
 ** jack2-2.x codebase incorporates jackaudio.org jack2-1.9.x codebase.
    For LADIOS, media-sound/jack2 is now jack2-2.x, the ladi-jack2 variants
 ** jackdbus is now packaged as media-sound/jackdbus
 ** media-sound/jack2 does not install jack server frontends (jackdbus, jackd) anymore

 * new: media-sound/jackdbus

 ** jackdbus-2.21.0.ebuild
 ** jackdbus-2.9999.ebuild

 * upd: media-sound/ladish
 ** ladish-1.9999.ebuild
 ** ladish-9999.ebuild
 ** updated ladish ebuilds now depends on ladi-jack2
 ** git src url adjusted to github.com/LADI one, git.nedk.org is down

== newebuild: Jan 26, 53 (2023)

 * A jack_mixer-17.ebuild

== updebuild: Jan 05, 53 (2023)

 * Set ladish git repo to github one
 * media-sound/ladish: add 3.10 and 3.11 to PYTHON_COMPAT
 * Add dev-cpp/libgnomecanvasmm
   Copied from main gentoo portage tree where it was removed.
   Gentoo Bug #808375

== updebuild: Sep 03, 52 (2022)

 * Fix media-sound/ladish maintainer in LADI overlay to match reality

== newebuild: Dec 25, 51 (2021)

Initial ladi51 repository

Upstream provides updates for the release 1
by pushing commits to the git branch named 1-stable

These commits are expected to not break
any API, ABI or user interface.

Intended uses of such commits are to adjust the codebase for
new hardware and new dependencies.

Downstream packagers that need more stability for their deployments
can use date-based tags in their local git mirros.

* Add ladish-1.9999 (upstream 1-stable git branch)
** Import ladish ebuilds from audio-overlay
** Restore gladish build, remove obsolete ebuild
